From 5bd5c17c741aa34879f7b875600055bea28e2cb7 Mon Sep 17 00:00:00 2001
From: "Thomas F. K. Jorna" <hello@tefkah.com>
Date: Mon, 18 Oct 2021 01:41:42 +0200
Subject: fix: correct label text for degree cap

---
 components/Tweaks/LabelsPanel.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'components/Tweaks/LabelsPanel.tsx')

diff --git a/components/Tweaks/LabelsPanel.tsx b/components/Tweaks/LabelsPanel.tsx
index c40b689..2b66e85 100644
--- a/components/Tweaks/LabelsPanel.tsx
+++ b/components/Tweaks/LabelsPanel.tsx
@@ -79,7 +79,7 @@ export const LabelsPanel = (props: LabelsPanelProps) => {
           <Collapse in={visuals.labelDynamicStrength > 0}>
             <SliderWithInfo
               label="Dynamic zoom degree cap"
-              infoText="By default, labels of nodes with more links will appear earlier than those with fewer. This slider changes the strength of this effect, put it at zero to disable it."
+              infoText="The maximum number of links that is considered for the 'dynamic zoom effect'. Past this number all number of links are treated the same."
               value={visuals.labelDynamicDegree}
               min={1}
               max={15}
-- 
cgit v1.2.3

